#
# Config template for: firewall conntrack-expect-table-size
# 
# This  is  the  table  of expectations.  Connection tracking expectations are 
# the mechanism used to "expect" RELATED connections to existing ones.  
# Expectations are generally used by "connection tracking helpers"  (sometimes 
# called application level gateways [ALGs]) for more complex protocols such as
# FTP, SIP, H.323. 
#
# default value when firewall is not set - 2048
# default value when firewall is set - 4096
#

type: u32

help: Set size of netfilter connection tracking expect table

default: 4096

comp_help:Possible completions:
  <1 - 50000000>\tNumber of entries allowed in connection tracking expect table

syntax:expression: ($VAR(@) >= 1 && $VAR(@) <= 50000000) ; "Value must be between 1 and 50,000,000"

update:
	sudo sh -c "echo $VAR(@) > \
    	 		/proc/sys/net/netfilter/nf_conntrack_expect_max"







