From 17a6da10c0fcb87edcad978daa1f1462515cc011 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 04:30:40 +0000
Subject: Fix Bug 3069 Help strings should be standardized - help strings
 standardized in vyatta-cfg-quagga

---
 templates/protocols/rip/distribute-list/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/protocols/rip/distribute-list/node.def')

diff --git a/templates/protocols/rip/distribute-list/node.def b/templates/protocols/rip/distribute-list/node.def
index 34c3cd35..f7255a70 100644
--- a/templates/protocols/rip/distribute-list/node.def
+++ b/templates/protocols/rip/distribute-list/node.def
@@ -1,2 +1,2 @@
-help: Filter networks in routing updates
+help: Set to filter networks in routing updates
 
-- 
cgit v1.2.3

