From 17a6da10c0fcb87edcad978daa1f1462515cc011 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 04:30:40 +0000
Subject: Fix Bug 3069 Help strings should be standardized - help strings
 standardized in vyatta-cfg-quagga

---
 templates/protocols/rip/passive-interface/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/protocols/rip/passive-interface/node.def')

diff --git a/templates/protocols/rip/passive-interface/node.def b/templates/protocols/rip/passive-interface/node.def
index 5a4001b5..135911b7 100644
--- a/templates/protocols/rip/passive-interface/node.def
+++ b/templates/protocols/rip/passive-interface/node.def
@@ -1,6 +1,6 @@
 multi:
 type: txt
-help: Suppress routing updates on an interface
+help: Set to suppress routing updates on an interface
 syntax:expression: exec " \
         if [ -z \"`ip addr | grep $VAR(@) `\" ] && [ x$VAR(@) != xdefault ]; then \
           echo ethernet interface $VAR(@) doesn\\'t exist on this system ; \
-- 
cgit v1.2.3

