From 17a6da10c0fcb87edcad978daa1f1462515cc011 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 04:30:40 +0000
Subject: Fix Bug 3069 Help strings should be standardized - help strings
 standardized in vyatta-cfg-quagga

---
 templates/protocols/rip/timers/garbage-collection/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/protocols/rip/timers/garbage-collection/node.def')

diff --git a/templates/protocols/rip/timers/garbage-collection/node.def b/templates/protocols/rip/timers/garbage-collection/node.def
index 2a7b2bc9..276efb19 100644
--- a/templates/protocols/rip/timers/garbage-collection/node.def
+++ b/templates/protocols/rip/timers/garbage-collection/node.def
@@ -1,6 +1,6 @@
 type: u32
 default: 120
-help: Garbage collection timer
+help: Set garbage collection timer
 syntax:expression: $VAR(@) >= 5 && $VAR(@) <= 2147483647; \
        "Garbage collection timer must be between 5 and 2147483647"
 comp_help: possible completions:
-- 
cgit v1.2.3

