From c3709a21b6f6f33ff7730385ce2170b046efa178 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Fri, 27 Feb 2009 19:00:10 -0800
Subject: Fix Bug 2463 Allow the neighbor table threshold values to be         
     modified via the CLI - (modify ARP table size) * added cli to configure
 [arp (ipv4)] and [neighbor (ipv6)] table-size * set default value for
 arp_announce so as to avoid local addresses that are   not in the target's
 subnet for the interface

---
 templates/system/ipv6/neighbor/table-size/node.def | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)
 create mode 100644 templates/system/ipv6/neighbor/table-size/node.def

(limited to 'templates/system/ipv6/neighbor/table-size/node.def')

diff --git a/templates/system/ipv6/neighbor/table-size/node.def b/templates/system/ipv6/neighbor/table-size/node.def
new file mode 100644
index 00000000..e8a55ac8
--- /dev/null
+++ b/templates/system/ipv6/neighbor/table-size/node.def
@@ -0,0 +1,17 @@
+help: Set maximum number of entries to keep in the Neighbor cache
+
+type: u32
+
+default: 1024
+
+allowed: echo "1024 2048 4096 8192 16384"
+
+syntax:expression: exec "                               \
+        /opt/vyatta/sbin/vyatta-update-arp-params       \
+                'syntax-check' 'table-size' '$VAR(@)' 'ipv6' "
+
+update:
+  /opt/vyatta/sbin/vyatta-update-arp-params 'update' 'table-size' '$VAR(@)' 'ipv6'
+
+delete:
+  /opt/vyatta/sbin/vyatta-update-arp-params 'delete' 'table-size' 'ipv6'
-- 
cgit v1.2.3

