From 0a60c68af7028fe58c3ece088c85fd3a04eb9a1f Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Fri, 10 Oct 2008 22:27:30 -0700
Subject: Fix Bug 3751 configuring multiple global syslog facilities overwrites
 previous ones in /etc/syslog.conf - multiple nodes configured under 'system
 syslog global' are appended to syslog.conf - default '*.notice
 -/var/log/messages' is removed from syslog.conf if any   node is configured
 under 'system syslog global' and is put back when nothing   configured under
 'system syslog global' - syslog process only restarted once after making all
 changes in config - added commit checks at 'system syslog <>' level nodes to
 specify facility

---
 templates/system/syslog/console/node.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'templates/system/syslog/console/node.def')

diff --git a/templates/system/syslog/console/node.def b/templates/system/syslog/console/node.def
index ec620885..7252ad79 100644
--- a/templates/system/syslog/console/node.def
+++ b/templates/system/syslog/console/node.def
@@ -1 +1,2 @@
 help: Set console logging
+commit:expression: $VAR(./facility/@@) != ""; "Atleast one facility must be configured to log messages to $VAR(.)"
-- 
cgit v1.2.3

