type: u32
help: Set interval after which a neighbor is declared dead
default: 40
syntax:expression: $VAR(@) >= 1 && $VAR(@) <= 65535; "Must be between 1-65535"
update:vyatta-vtysh -c "configure terminal" -c "interface $IFNAME" -c "ip ospf dead-interval $VAR(@)"
delete:vyatta-vtysh -c "configure terminal" -c "interface $IFNAME" -c "no ip ospf dead-interval"
comp_help: possible completions:
 <1-65535>          Seconds (default 40)
