help: Disable split horizon on specified interface
create:vyatta-vtysh -c "configure terminal" -c "interface $IFNAME" -c "no ip rip split-horizon "
delete:vyatta-vtysh -c "configure terminal" -c "interface $IFNAME" -c "ip rip split-horizon " "

commit:expression: ($VAR(../poison-reverse/) == ""); \
    "You cannot have 'split-horizon poison-reverse' enabled with 'split-horizon' disabled for $IFNAME"
