help: Disable Maximum Transmission Unit mismatch detection
create:vtysh -c "configure terminal" -c "interface $VAR(../../../@)" -c "ipv6 ospf6 mtu-ignore"
delete:vtysh -c "configure terminal" -c "interface $VAR(../../../@)" -c "no ipv6 ospf6 mtu-ignore"

