multi:
type: txt
help: Set interface to exclude when using 'passive-interface default'

allowed: ${vyatta_sbindir}/vyatta-interfaces.pl --show all 

syntax:expression: $VAR(../passive-interface/@) == "default"; \
  "passive-interface-excluded can only be used with 'passive-interface default'"

commit:expression: exec "/opt/vyatta/sbin/vyatta-interfaces.pl --dev=$VAR(@) --warn"

create: if [ -z $VAR(@) ] ; then
          echo "Error: must include interface";
          exit 1;
     	else  
          vtysh -c "configure terminal" -c "router ospf" \
             -c "no passive-interface $VAR(@)"
	fi;

delete: vtysh -c "configure terminal" -c "router ospf" \
          -c "passive-interface $VAR(@)";

comp_help: possible completions:
  <interface>     Set an interface to exclude from 'passive-interface default'
