multi:
type: txt
help: Set to suppress routing updates on an interface
allowed: ${vyatta_sbindir}/vyatta-interfaces.pl --show all && echo default
create: if [ -z $VAR(@) ]
        then  vtysh -c "configure terminal" -c "router ospf" \
          -c "passive-interface default";
     	else  vtysh -c "configure terminal" -c "router ospf" \
          -c "passive-interface $VAR(@)"
	fi
delete: if [ -z $VAR(@) ]
	then vtysh -c "configure terminal" -c "router ospf" \
          -c "no passive-interface default"
	else vtysh -c "configure terminal" -c "router ospf" \
          -c "no passive-interface $VAR(@)"
 	fi
comp_help: possible completions:
  <interface>     Set an interface to be passive (i.e. suppress routing updates)
  default         Set default to suppress routing updates on all interfaces
