<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">type: u32
help: Set refresh timer
syntax:expression: $VAR(@) &gt;= 10 &amp;&amp; $VAR(@) &lt;= 1800; "must be between 10-1800"
update:expression: "${vyatta_sbindir}/vyatta-vtysh.pl -c \"configure terminal\" -c \"router ospf\" \
        -c \"no refresh timer\" -c \"refresh timer $VAR(@)\"; "
delete:expression: "${vyatta_sbindir}/vyatta-vtysh.pl -c \"configure terminal\" -c \"router ospf\" \
        -c \"no refresh timer $VAR(@)\"; "
comp_help: &lt;10-1800&gt; Timer value in seconds
</pre></body></html>