multi:
type: txt
help: Set to suppress routing updates on an interface
syntax:expression: exec " \
        if [ -z \"`ip addr | grep $VAR(@) `\" ] && [ x$VAR(@) != xdefault ]; then \
          echo ethernet interface $VAR(@) doesn\\'t exist on this system ; \
          exit 1 ; \
        fi ; "
update: if [ x$VAR(x) == xdefault ]
        then vyatta-vtysh -c "configure terminal" -c "router rip" \
            -c "passive-interface default"
        else vyatta-vtysh -c "configure terminal" -c "router rip" \
            -c "passive-interface $VAR(@)"
        fi
delete: if [ x$VAR(x) == xdefault ]
        then vyatta-vtysh -c "configure terminal" -c "router rip" \
            -c "no passive-interface default"
         else vyatta-vtysh -c "configure terminal" -c "router rip" \
            -c "no passive-interface $VAR(@)"
         fi
allowed: ${vyatta_sbindir}/vyatta-interfaces.pl --show all
