help: "Set RIP timer values"
delete: "touch /tmp/rip-timers.\\$PPID"
end: "/usr/bin/vtysh -c \"configure terminal\" -c \"router rip\" \
        -c \"no timers basic\"; \
      if [ -f \"/tmp/rip-timers.\\$PPID\" ]; then \
        rm -rf /tmp/rip-timers.\\$PPID; \
      else \
        /usr/bin/vtysh -c \"configure terminal\" -c \"router rip\" \
          -c \"timers basic $(./update/@) $(./timeout/@) $(./garbage-collection/@)\"; \
      fi; "

