type: u32
default: 30
help: Routing table update timer
syntax:expression: $VAR(@) >= 5 && $VAR(@) <= 2147483647; \
       "Update timer must be between 5 and 2147483647"
val_help: u32:5-2147483647; Routing table update timer in seconds (default 30)
