type: u32
default: 120
help: Set garbage collection timer

syntax:expression: $VAR(@) >= 0 && $VAR(@) <= 65535; \
       "Garbage collection timer must be between 0 and 65535"

comp_help: possible completions:
  <0-65535>      Garbage colletion time (default 120)
