type: u32
default: 120
help: Set garbage collection timer
val_help: u32:0-65535; Garbage colletion time (default 120)

syntax:expression: $VAR(@) >= 0 && $VAR(@) <= 65535; \
       "Garbage collection timer must be between 0 and 65535"
