type: u32
default: 30
help: Set routing table update timer
val_help: u32:0-65535; Routing table update timer in seconds (default 30)

syntax:expression: $VAR(@) >= 0 && $VAR(@) <= 65535; \
       "Update timer must be between 0 and 65535"
