type: u32
default: 30
help: Set routing table update timer

syntax:expression: $VAR(@) >= 0 && $VAR(@) <= 65535; \
       "Update timer must be between 0 and 65535"

comp_help: possible completions:
  <0-65535>     Routing table update timer in seconds (default 30)
