From 184b44142142f848f46e33e03a4ca8504b694990 Mon Sep 17 00:00:00 2001
From: Stephen Hemminger <shemminger@vyatta.com>
Date: Thu, 3 Nov 2011 07:29:59 -0700
Subject: pseudo-ethernet remove incorrect template

The path:
  interfaces pseudo-ethernet link

was a accidental leftover. Correct template is in
  interfaces pseudo-ethernet peth0 link
---
 templates/interfaces/pseudo-ethernet/link/node.def | 5 -----
 1 file changed, 5 deletions(-)
 delete mode 100644 templates/interfaces/pseudo-ethernet/link/node.def

(limited to 'templates/interfaces/pseudo-ethernet/link/node.def')

diff --git a/templates/interfaces/pseudo-ethernet/link/node.def b/templates/interfaces/pseudo-ethernet/link/node.def
deleted file mode 100644
index 40818d54..00000000
--- a/templates/interfaces/pseudo-ethernet/link/node.def
+++ /dev/null
@@ -1,5 +0,0 @@
-type: txt
-syntax:expression: exec \
-	"/opt/vyatta/sbin/vyatta-interfaces.pl --dev=$VAR(@) --check=ethernet"
-allowed: /opt/vyatta/sbin/vyatta-interfaces.pl --show=ethernet
-help: Lower link device
-- 
cgit v1.2.3

