From c5b2e6f32bd19406c4b7f48a674062b585fa76e0 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 06:26:20 +0000
Subject: Fix Bug 3069 Help strings should be standardized -help strings
 standardized in vyatta-cfg-system

---
 templates/protocols/snmp/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/protocols/snmp/node.def')

diff --git a/templates/protocols/snmp/node.def b/templates/protocols/snmp/node.def
index 62adc534..3612f2b6 100644
--- a/templates/protocols/snmp/node.def
+++ b/templates/protocols/snmp/node.def
@@ -1,4 +1,4 @@
-help: Configure SNMP
+help: Configure Simple Network Management Protocol (SNMP)
 commit:expression: $VAR(community/) != ""; "must configure a community"
 create:expression: "/opt/vyatta/sbin/vyatta-snmp.pl --init-snmp"
 delete:expression: "touch /tmp/snmp.$PPID"
-- 
cgit v1.2.3

