From 3e62229285ce90c6b56eab5f79f1559c4156641d Mon Sep 17 00:00:00 2001
From: Alex Harpin <development@landsofshadow.co.uk>
Date: Tue, 2 Sep 2014 20:30:05 +0100
Subject: vyatta-cfg-system: remove quotes from SysContact and SysLocation

When the values for SysContact, SysLocation and SysDecr are written to
the snmpd.conf file, they are enclosed in backslash escaped quotes.
This isn't part of the syntax for snmpd.conf and looks wrong / could
break snmp related things, the example snmpd.conf files show these
values as unquoted.

This patch corrects the output and adds validation for the supplied
values, limiting them to a maximum of 255 printable characters
(RFC 3418).

The documentation also needs amending to take this into account.

Bug #261 http://bugzilla.vyos.net/show_bug.cgi?id=261
---
 templates/service/snmp/location/node.def | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'templates/service/snmp/location/node.def')

diff --git a/templates/service/snmp/location/node.def b/templates/service/snmp/location/node.def
index a5b234ea..903b405f 100644
--- a/templates/service/snmp/location/node.def
+++ b/templates/service/snmp/location/node.def
@@ -1,3 +1,6 @@
 type: txt
 help: Location information
 
+syntax:expression: pattern $VAR(@) "^[[:print:]]{1,255}$" ; \
+                   "Location is limited to 255 characters or less"
+
-- 
cgit v1.2.3

