From c5b2e6f32bd19406c4b7f48a674062b585fa76e0 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 06:26:20 +0000
Subject: Fix Bug 3069 Help strings should be standardized -help strings
 standardized in vyatta-cfg-system

---
 templates/system/domain-name/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/system/domain-name/node.def')

diff --git a/templates/system/domain-name/node.def b/templates/system/domain-name/node.def
index 9101f2f3..2ddc8e44 100644
--- a/templates/system/domain-name/node.def
+++ b/templates/system/domain-name/node.def
@@ -1,5 +1,5 @@
 type: txt
-help: Configure system domain name
+help: Set system domain name
 syntax:expression: pattern $VAR(@) "^[-a-zA-Z0-9.]{0,63}$" ; "invalid domain name $VAR(@)"
 
 # also add localhost line into /etc/hosts (see host-name template)?
-- 
cgit v1.2.3

