From c5b2e6f32bd19406c4b7f48a674062b585fa76e0 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 06:26:20 +0000
Subject: Fix Bug 3069 Help strings should be standardized -help strings
 standardized in vyatta-cfg-system

---
 templates/system/login/user/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/system/login/user/node.def')

diff --git a/templates/system/login/user/node.def b/templates/system/login/user/node.def
index 205a4b7a..d23a397f 100644
--- a/templates/system/login/user/node.def
+++ b/templates/system/login/user/node.def
@@ -1,6 +1,6 @@
 tag:
 type: txt
-help: User account information
+help: Set user account information
 commit:expression: $VAR(authentication/encrypted-password) != ""
                    || ($VAR(authentication/plaintext-password) != ""
                        && $VAR(authentication/plaintext-password/@) != "")
-- 
cgit v1.2.3

