From c5b2e6f32bd19406c4b7f48a674062b585fa76e0 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 06:26:20 +0000
Subject: Fix Bug 3069 Help strings should be standardized -help strings
 standardized in vyatta-cfg-system

---
 templates/system/package/auto-sync/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/system/package/auto-sync/node.def')

diff --git a/templates/system/package/auto-sync/node.def b/templates/system/package/auto-sync/node.def
index 9300848e..3d14ab04 100644
--- a/templates/system/package/auto-sync/node.def
+++ b/templates/system/package/auto-sync/node.def
@@ -3,7 +3,7 @@
 # the /etc/crontab file must have the daily line for daily to be run
 type: u32
 default: 1
-help: Update the the repository cache every n days. 0 disables auto-update.
+help: Set to update the the repository cache every n days (0 disables auto-update)
 syntax:expression: $VAR(@) >= 0 && $VAR(@) < 32 ; "auto-sync must be between 0 and 32 days"
 update:expression: "sudo sh -c \"touch /etc/apt/apt.conf && \
 sed -i '/APT::Periodic::Update-Package-Lists*/d' /etc/apt/apt.conf && \
-- 
cgit v1.2.3

