From c5b2e6f32bd19406c4b7f48a674062b585fa76e0 Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Thu, 10 Apr 2008 06:26:20 +0000
Subject: Fix Bug 3069 Help strings should be standardized -help strings
 standardized in vyatta-cfg-system

---
 templates/system/static-host-mapping/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/system/static-host-mapping/node.def')

diff --git a/templates/system/static-host-mapping/node.def b/templates/system/static-host-mapping/node.def
index e72527ae..0eeace02 100644
--- a/templates/system/static-host-mapping/node.def
+++ b/templates/system/static-host-mapping/node.def
@@ -1 +1 @@
-help: Map DNS names to system interfaces
+help: Set to map DNS names to system interfaces
-- 
cgit v1.2.3

