help: Restart cluster node

run:
    if cli-shell-api existsEffective cluster; then
	echo -n "Restarting cluster node..."
	sudo /etc/init.d/heartbeat restart >&/dev/null
	if [[ $? -eq 0 ]]; then
	  echo "Success!"
	fi
    fi