From 12f8b7020aacadee0951e702cdd7f157843ded94 Mon Sep 17 00:00:00 2001
From: Stephen Hemminger <shemminger@vyatta.com>
Date: Tue, 14 Feb 2012 16:49:56 -0800
Subject: Make sure all node.def files have newline at end of file

Avoid future problems with (like diff) by making sure that there is a newline
on last line of file.
---
 templates-cfg/system/conntrack/timeout/tcp/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates-cfg/system/conntrack/timeout/tcp/node.def')

diff --git a/templates-cfg/system/conntrack/timeout/tcp/node.def b/templates-cfg/system/conntrack/timeout/tcp/node.def
index 2b67c51..fd1c34f 100644
--- a/templates-cfg/system/conntrack/timeout/tcp/node.def
+++ b/templates-cfg/system/conntrack/timeout/tcp/node.def
@@ -1 +1 @@
-help: TCP connection timeout options
\ No newline at end of file
+help: TCP connection timeout options
-- 
cgit v1.2.3

