#
# Config template for: system conntrack table-size
# 
# Sets the size of the TCP connection tracking table in the netfilter
# nf_conntrack module, which is used by firewall and NAT.  The size of
# this table determines how many TCP connections can be simultaneously
# tracked.  If new connections arrive and the table is full, older
# connections will be dropped out of the table.  System administrators
# must set the connection tracking table size based on the number of
# connections they expect their system to track.  The connection
# tracking table consumes kernel memory, so the size selected should
# be no larger than necessary.
#
# default value when contrack is not set - 16384
# default value when conntrack is set - 32768
#

type: u32

help: Size of connection tracking table

default: 32768

val_help: u32:1-50000000; Number of entries allowed in connection tracking table

syntax:expression: ($VAR(@) >= 1 && $VAR(@) <= 50000000) ; "Value must be between 1 and 50000000"

update:
	sudo sysctl -q -w net/nf_conntrack_max=$VAR(@)
  # need to restart conntrackd with updated conntrack table size
  if cli-shell-api existsActive service conntrack-sync; then
    sudo /opt/vyatta/sbin/vyatta-conntrack-sync.pl --action=enable
  fi






