From fa38551031d0a0e37663fe465b3847f652b2c5a4 Mon Sep 17 00:00:00 2001
From: Stig Thormodsrud <stig@vyatta.com>
Date: Mon, 29 Nov 2010 15:57:22 -0800
Subject: Fix 5163: 'show firewall' displays misleading output when firewall
 groups are used Replace "show firewall" with "show firewall detail" output.

---
 templates/show/firewall/ipv6-name/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/show/firewall/ipv6-name/node.def')

diff --git a/templates/show/firewall/ipv6-name/node.def b/templates/show/firewall/ipv6-name/node.def
index b14bdec..ffd322d 100644
--- a/templates/show/firewall/ipv6-name/node.def
+++ b/templates/show/firewall/ipv6-name/node.def
@@ -1,2 +1,2 @@
 help: Show IPv6 firewall chains
-run: ${vyatta_bindir}/vyatta-show-firewall.pl "$3_all" /opt/vyatta/share/xsl/show_firewall.xsl
+run: ${vyatta_bindir}/vyatta-show-firewall.pl "$3_all" /opt/vyatta/share/xsl/show_firewall_detail.xsl
-- 
cgit v1.2.3

