From c5465562b9024af57af12280d89d2a189bdb9110 Mon Sep 17 00:00:00 2001
From: Christian Breunig <christian@breunig.cc>
Date: Thu, 27 Jul 2023 21:57:19 +0200
Subject: T5411: remove old background monitor implementation

Old Vyatta had a possibility to issue log entries to the users console based
on a service.

Examples:

* monitor dhcp background start | stop
* monitor lldp background start | stop
* monitor openvpn background start | stop

Somehow they not seem to work properly anymore (we are not certain if they
ever did work properly)

The maintainers decided to drop the op-mode CLI nodes from vyatta-op package in
order to get rid of all the legacy code.

In a subsequent task we might wan't to re-add this capability under the more
"industry standard" command terminal monitor.
---
 templates/monitor/https/background/start/node.def | 2 --
 1 file changed, 2 deletions(-)
 delete mode 100644 templates/monitor/https/background/start/node.def

(limited to 'templates/monitor/https/background/start/node.def')

diff --git a/templates/monitor/https/background/start/node.def b/templates/monitor/https/background/start/node.def
deleted file mode 100644
index ae87d88..0000000
--- a/templates/monitor/https/background/start/node.def
+++ /dev/null
@@ -1,2 +0,0 @@
-help: Start background monitoring of the HTTPS service
-run: ${vyatta_bindir}/vyatta-monitor-background HTTPS lighttpd chunker webgui
-- 
cgit v1.2.3

