From e08a8546936fe6801d718c85e3723d2ea6d33cc9 Mon Sep 17 00:00:00 2001
From: Daniil Baturin <daniil@baturin.org>
Date: Tue, 15 May 2018 03:14:12 +0200
Subject: T638: remove the old handwritten templates for bmon commands. Turns
 out they were there, just overwriten by the gen-monitor-* so no one noticed.

---
 templates/monitor/interfaces/ethernet/node.def | 2 --
 1 file changed, 2 deletions(-)
 delete mode 100644 templates/monitor/interfaces/ethernet/node.def

(limited to 'templates/monitor/interfaces/ethernet/node.def')

diff --git a/templates/monitor/interfaces/ethernet/node.def b/templates/monitor/interfaces/ethernet/node.def
deleted file mode 100644
index 60c4970..0000000
--- a/templates/monitor/interfaces/ethernet/node.def
+++ /dev/null
@@ -1,2 +0,0 @@
-help: Monitor a ethernet interface
-run: bmon -p eth*,!eth*v*,!eth*.*
-- 
cgit v1.2.3

