From db48113ce1d5ded7f7916403d7c532a91bff7756 Mon Sep 17 00:00:00 2001
From: John Southworth <john.southworth@vyatta.com>
Date: Tue, 6 Sep 2011 18:58:04 -0500
Subject: Background monitoring for services (cherry picked from commit
 3a77209514688f91476322562c5fb1be505a71b8)

---
 templates/monitor/service/https/background/stop/node.def | 2 ++
 1 file changed, 2 insertions(+)
 create mode 100644 templates/monitor/service/https/background/stop/node.def

(limited to 'templates/monitor/service/https/background/stop/node.def')

diff --git a/templates/monitor/service/https/background/stop/node.def b/templates/monitor/service/https/background/stop/node.def
new file mode 100644
index 0000000..ec3ab8c
--- /dev/null
+++ b/templates/monitor/service/https/background/stop/node.def
@@ -0,0 +1,2 @@
+help: Stop background monitoring of the HTTPS service
+run: ${vyatta_bindir}/vyatta-monitor-background-stop HTTPS
-- 
cgit v1.2.3

