From 6824c5341d20bee84cf9ce001fee9218503ac90f Mon Sep 17 00:00:00 2001
From: Mohit Mehta <mohit.mehta@vyatta.com>
Date: Fri, 4 Apr 2008 23:59:50 +0000
Subject: Fix Bug 3069 Help strings should be standardized - vyatta-op help
 strings standardized according to latest guideline

---
 templates/show/arp/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/show/arp/node.def')

diff --git a/templates/show/arp/node.def b/templates/show/arp/node.def
index 021f848..bac6fdb 100644
--- a/templates/show/arp/node.def
+++ b/templates/show/arp/node.def
@@ -1,2 +1,2 @@
-help: Show Address Resolution Protocol Information
+help: Show Address Resolution Protocol information
 run: /usr/sbin/arp -e
-- 
cgit v1.2.3

