From b90c428efd97c4112061f4acd7b866ea230fb507 Mon Sep 17 00:00:00 2001
From: Christian Poessinger <christian@poessinger.com>
Date: Wed, 3 Jun 2020 16:31:04 +0200
Subject: T2546: initial migration to vyos-1x

- show interfaces ethernet eth0 physical
- show interfaces ethernet eth0 physical offload
- show interfaces ethernet eth0 statistics
- show interfaces ethernet eth0 transceiver
- show license
---
 templates/show/interfaces/ethernet/node.def | 2 --
 1 file changed, 2 deletions(-)
 delete mode 100644 templates/show/interfaces/ethernet/node.def

(limited to 'templates/show/interfaces/ethernet/node.def')

diff --git a/templates/show/interfaces/ethernet/node.def b/templates/show/interfaces/ethernet/node.def
deleted file mode 100644
index 5c31928..0000000
--- a/templates/show/interfaces/ethernet/node.def
+++ /dev/null
@@ -1,2 +0,0 @@
-help: Show ethernet interface information
-run: ${vyatta_bindir}/vyatta-show-interfaces.pl --intf-type=ethernet --action=show-brief
-- 
cgit v1.2.3

