From a6bd76a42085fda394b74b8d975790a3b05cac6c Mon Sep 17 00:00:00 2001
From: Stephen Hemminger <stephen.hemminger@vyatta.com>
Date: Thu, 15 Apr 2010 13:51:46 -0700
Subject: Add Input Functional Block device support

---
 templates/show/interfaces/input/node.def | 2 ++
 1 file changed, 2 insertions(+)
 create mode 100644 templates/show/interfaces/input/node.def

(limited to 'templates/show/interfaces/input/node.def')

diff --git a/templates/show/interfaces/input/node.def b/templates/show/interfaces/input/node.def
new file mode 100644
index 0000000..9114561
--- /dev/null
+++ b/templates/show/interfaces/input/node.def
@@ -0,0 +1,2 @@
+help: Show input functional block interface information
+run: ${vyatta_bindir}/vyatta-show-interfaces.pl --intf-type=input --action=show-brief
-- 
cgit v1.2.3

