From 7a2d3922d2ed74e6e8bc54efe5ce0a63819112d7 Mon Sep 17 00:00:00 2001
From: Viacheslav Hletenko <v.gletenko@vyos.io>
Date: Sun, 14 Jan 2024 23:45:41 +0000
Subject: T905: Delete old op-mode command show remote-config

The op-mode command `show remote-config` did not work for several
years. Since it uses the old backend we should delete it now.
Will be redefined if necessary with a separate task, PR

```
vyos@r1:~$ show remote-config

  Invalid command: show remote-config [invalid]

vyos@r1:~$ show remote-config

  Incomplete command: show remote-config

vyos@r1:~$

```

(cherry picked from commit ea06a4612285ef4cf3d93220840df32fbc7949c1)
---
 templates/show/remote-config/node.def | 1 -
 1 file changed, 1 deletion(-)
 delete mode 100644 templates/show/remote-config/node.def

(limited to 'templates/show/remote-config/node.def')

diff --git a/templates/show/remote-config/node.def b/templates/show/remote-config/node.def
deleted file mode 100644
index 1675abd..0000000
--- a/templates/show/remote-config/node.def
+++ /dev/null
@@ -1 +0,0 @@
-help: Show remote side config
-- 
cgit v1.2.3

