From ef2299e107f9020f77be26d2a109f030d0ea50b2 Mon Sep 17 00:00:00 2001
From: Stephen Hemminger <stephen.hemminger@vyatta.com>
Date: Thu, 12 Mar 2009 10:37:49 -0700
Subject: Fix formatting of output

Add needed space.
---
 templates/show/shutdown/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/show/shutdown/node.def')

diff --git a/templates/show/shutdown/node.def b/templates/show/shutdown/node.def
index ecc8c4b..52bd3a4 100644
--- a/templates/show/shutdown/node.def
+++ b/templates/show/shutdown/node.def
@@ -1,7 +1,7 @@
 help: Show scheduled shutdown
 run: if [ -f /var/run/shutdown.pid ]
      then if [ -r /tmp/shutdown.at ]
-	  then echo -n "Shutdown pending at"; cat /tmp/shutdown.at
+	  then echo -n "Shutdown pending at "; cat /tmp/shutdown.at
 	  else echo "Shutdown pending"
 	  fi
      else echo "No shutdown pending"
-- 
cgit v1.2.3

