From 009a4536a3d43d1a7166aef5ad2829cf068f0aa9 Mon Sep 17 00:00:00 2001
From: Thore <ThoreKr@users.noreply.github.com>
Date: Sun, 19 Mar 2017 22:22:29 +0100
Subject: Exchange vyatta with vyos

When typing "show system" and pressing tab the autosuggestion still said the installation was based on a vyatta image.
---
 templates/show/system/image/node.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'templates/show/system/image/node.def')

diff --git a/templates/show/system/image/node.def b/templates/show/system/image/node.def
index 08caab7..0766094 100644
--- a/templates/show/system/image/node.def
+++ b/templates/show/system/image/node.def
@@ -1,2 +1,2 @@
-help: Show installed Vyatta images
+help: Show installed VyOS images
 run: /opt/vyatta/bin/vyatta-boot-image.pl --show
-- 
cgit v1.2.3

