From fb100420fd6d54d5e86bf090f1123636cd2dc4e6 Mon Sep 17 00:00:00 2001
From: John Southworth <john.southworth@vyatta.com>
Date: Fri, 14 Oct 2011 11:45:17 -0500
Subject: Bugfix 7557: Move shutdown to poweroff, change confirmation from
 default in the affirmative to defualt in the negative. (cherry picked from
 commit 54c32901389933b1830404f173b338f885add043)

---
 templates/shutdown/at/node.def | 1 -
 1 file changed, 1 deletion(-)
 delete mode 100644 templates/shutdown/at/node.def

(limited to 'templates/shutdown/at/node.def')

diff --git a/templates/shutdown/at/node.def b/templates/shutdown/at/node.def
deleted file mode 100644
index baa0023..0000000
--- a/templates/shutdown/at/node.def
+++ /dev/null
@@ -1 +0,0 @@
-help: Shutdown at a specific time
-- 
cgit v1.2.3

