help: Enter configure mode
run: if [ `id -u` == 0 ]; then
         echo "You are attempting to enter configuration mode as root."
         echo "It may have unintended consequences and render your system"
         echo "unusable until restart."
         echo "Please do it as an administrator level VyOS user instead."
     else
         history -w
         export _OFR_CONFIGURE=ok
         newgrp vyattacfg
         unset _OFR_CONFIGURE
         _vyatta_op_do_key_bindings
         history -r
     fi
