help: Show running configuration (including default values)
run: if [ "$VYATTA_USER_LEVEL_DIR" == "/opt/vyatta/etc/shell/level/admin" ]; 
     then
        cli-shell-api showCfg --show-show-defaults --show-active-only
     else
        echo Must be an admin user to run this command.
     fi
